---
layout: api
page_title: /sys/leader - HTTP API
sidebar_title: <code>/sys/leader</code>
description: |-
  The `/sys/leader` endpoint is used to check the high availability status and
  current leader of Vault.
---

# `/sys/leader`

The `/sys/leader` endpoint is used to check the high availability status and
current leader of Vault.

## Read Leader Status

This endpoint returns the high availability status and current leader instance
of Vault.

| Method | Path          |
| :----- | :------------ |
| `GET`  | `/sys/leader` |

### Sample Request

```
$ curl \
    http://127.0.0.1:8200/v1/sys/leader
```

### Sample Response

```json
{
  "ha_enabled": true,
  "is_self": false,
  "leader_address": "https://127.0.0.1:8200/",
  "leader_cluster_address": "https://127.0.0.1:8201/",
  "performance_standby": false,
  "performance_standby_last_remote_wal": 0
}
```
